%
% Network.tex
%
% Fork Sand IT Manual
%
% Copyright (C) 2018, Fork Sand, Inc.
% Copyright (C) 2017, Jeff Moe
% Copyright (C) 2017 Aleph Objects, Inc.
%
% This document is licensed under the Creative Commons Attribution 4.0
% International Public License (CC BY-SA 4.0) by Fork Sand, Inc.
%


\section{Network Diagaram}

This is an overview of the network.


The first diagram is an overview, with networks listed, without the admin network.

XXX Diagram.

%\begin{figure}[h!]
%\includegraphics[keepaspectratio=true,height=1.00\textheight,width=1.00\textwidth,angle=90]{fs-cloud-net-overview.pdf}
% \caption{Fork Sand IT Manual Network Overview without Admin Net}
% \label{fig:fs-cloud-net-overview}
%\end{figure}

The second network, shows most servers, without the admin network.

XXX Diagram.

%\begin{figure}[h!]
%\includegraphics[keepaspectratio=true,height=1.00\textheight,width=1.00\textwidth,angle=90]{ao-cloud-net.pdf}
% \caption{Fork Sand IT Manual Network without Admin Net}
% \label{fig:ao-cloud-net}
%\end{figure}


\section{Switches}
Some day there will be a real free software network switch we'll
be able to use... For now we will be using:

\begin{itemize}
 \item TP Link 48-port 1 Gigabit RJ-45
 \item Netgear 16-port 10 Gigabit RJ-45
\end{itemize}


\section{IPMI Administration}
The servers have low level administration done via HTML5 IPMI.
OpenBMC will be used, where possible.

