<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">%
% Firmware.tex
%
% Fork Sand IT Manual
%
% Copyright (C) 2018, Fork Sand, Inc.
% Copyright (C) 2017, Jeff Moe
%
% This document is licensed under the Creative Commons Attribution 4.0
% International Public License (CC BY-SA 4.0) by Fork Sand, Inc.
%

\section{Overview of Firmware}
\label{sec:overview-firmware}

There is a lot of firmware in workstations, often non-free.
Various projects replace some non-free binaries.

\begin{itemize}
 \item BIOS
 \item Hard drive firmware
 \item Keyboard controller
 \item on and on...
\end{itemize}


\section{Coreboot}
\Gls{coreboot} is used on Viking.net servers.


\section{OpenBMC}
\Gls{openbmc} is used on Raptor Computing Systems OpenPOWER workstations.

\begin{itemize}
 \item Github:
  Website: \\ \url{https://github.com/openbmc/openbmc}
\end{itemize}

</pre></body></html>